TEMPLATE:  Belly Band to Fit 12 Inch Outer Sleeve with 3mm Spine

40 mm

3.5 mm

FRONT

313 mm

KEY
Trim Line
Folded Area For Spine (Not a cutting line)
3mm Safety Area - Important text and logos should not be in this area.
3mm Required Bleed Area - Background should extend to this line.

Please click here for useful information on how best to set up and supply your artwork.

For any further questions please email our design team here.

671.5 mm

@dmsvinyl

/dmsvinyl

BACK

311.5 mm

50 mm